



\section{
\label{training9.tex}
Training Step 9: Create Configuration File}


As a final step, a configuration file for the decoder is generated
with all the correct paths for the generated model and a number 
of default parameter settings.



This file is called {\tt model/moses.ini}



You will also need to train a language model. This is described in
the decoder manual.



Note that the configuration file set -{}-by default-{}- the usage of SRILM
as a LM toolkit. If you prefer to use another LM toolkit, change the 
configuration file as described
here\footnote{\sf http://www.statmt.org/moses/?n=FactoredTraining.BuildingLanguageModel\#ntoc1}







\begin{center}\textit{\small Subsection last  modified on September 26, 2011, at 09:16 AM}\end{center}
